\begin{tabular}{lccccccc} 
\\[-1.8ex]\hline 
\hline \\[-1.8ex] 
\\[-1.8ex] Response/Predictors & SR & RF & GBM & CIF & LASSO & PLSR & SVM \\
\hline \\[-1.8ex]
\multicolumn{8}{l}{CD4:CD8 Ratio} \\
\\[-1.8ex]
PP+N4 & \SI{99}{\percent} & \SI{86.8}{\percent} & \SI{96.3}{\percent} & \SI{84.5}{\percent} & \SI{88.6}{\percent} & \SI{92.5}{\percent} & \SI{88.5}{\percent}\\
PP+N6 & \SI{99}{\percent} & \SI{73.6}{\percent} & \SI{95.9}{\percent} & \SI{70.1}{\percent} & \SI{81.0}{\percent} & \SI{95.8}{\percent} & \SI{79.7}{\percent}\\
PP+S6 & \SI{99}{\percent} & \SI{87.1}{\percent} & \SI{99.9}{\percent} & \SI{83.4}{\percent} & \SI{87.2}{\percent} & \SI{97.9}{\percent} & \SI{86.8}{\percent}\\
PP+S6+N6 & \SI{99}{\percent} & \SI{85.5}{\percent} & \SI{95.3}{\percent} & \SI{83.4}{\percent} & \SI{92.9}{\percent} & \SI{99.7}{\percent} & \SI{90.5}{\percent}\\

\hline \\[-1.8ex]
\multicolumn{8}{l}{\ptmemh{} cells} \\
\\[-1.8ex]
PP+N4 & \SI{97}{\percent} & \SI{67.0}{\percent} & \SI{93.6}{\percent} & \SI{69.3}{\percent} & \SI{34.3}{\percent} & \SI{90.1}{\percent} & \SI{75.5}{\percent}\\
PP+N6 & \SI{96}{\percent} & \SI{45.9}{\percent} & \SI{92.6}{\percent} & \SI{51.2}{\percent} & \SI{42.8}{\percent} & \SI{92.1}{\percent} & \SI{79.4}{\percent}\\
PP+S6 & \SI{98}{\percent} & \SI{71.4}{\percent} & \SI{99.9}{\percent} & \SI{75.0}{\percent} & \SI{74.9}{\percent} & \SI{80.0}{\percent} & \SI{75.5}{\percent}\\
PP+S6+N6 & \SI{98}{\percent} & \SI{68.2}{\percent} & \SI{95.6}{\percent} & \SI{74.4}{\percent} & \SI{72.5}{\percent} & \SI{81.7}{\percent} & \SI{77.0}{\percent}\\

\hline \\[-1.8ex]
\multicolumn{8}{l}{\ptmemk{} cells} \\
\\[-1.8ex]
PP+N4 & \SI{93}{\percent} & \SI{4.7}{\percent} & \SI{44.4}{\percent} & \SI{9.2}{\percent} & \SI{1.2}{\percent} & \SI{65.1}{\percent} & \SI{9.1}{\percent}\\
PP+N6 & \SI{86}{\percent} & \SI{2.0}{\percent} & \SI{29.9}{\percent} & \SI{15.8}{\percent} & \SI{28.5}{\percent} & \SI{63.3}{\percent} & \SI{30.6}{\percent}\\
PP+S6 & \SI{93}{\percent} & \SI{7.8}{\percent} & \SI{28.0}{\percent} & \SI{15.1}{\percent} & \SI{76.2}{\percent} & \SI{98.4}{\percent} & \SI{49.8}{\percent}\\
PP+S6+N6 & \SI{93}{\percent} & \SI{0.3}{\percent} & \SI{32.7}{\percent} & \SI{9.8}{\percent} & \SI{51.5}{\percent} & \SI{96.4}{\percent} & \SI{37.8}{\percent}\\

\hline \\[-1.8ex] 
\end{tabular} 